A7 Long Template

Landscape format

Trimmed Size: 148mm x 52mm. The Bleed/Artboard size is: 154mm x 58mm

Rotate for Portrait

Bleed Area	This is trimmed away. Ensure backgrounds, images and colour extend into this area. This guarantees a great finish!
Trim Edge 	This is where we trim your design to the ordered size.
Safe Area 	It’s always best to keep any important text, logos in from the trim edge. Anything less than 3mm is not recommended

➠

✁

✗

✓

Need help? 01903 742003 www.alocalprinter.co.uk