DL Template

Trimmed Size: 210mm x 99mm. The Bleed/Artboard size is: 216mm x 154mm

Rotate for Portrait

Landscape format

➠

Bleed Area	This is trimmed away. Ensure backgrounds, images and 				colour extend into this area. This guarantees a great finish!
Trim Edge 	This is where we trim your design to the ordered size.
Safe Area 	It’s always best to keep any important text, logos in from the 				trim edge. Anything less than 3mm is not recommended

Need help?
01903 742003

✁

www.alocalprinter.co.uk

✗

✓