Code: A4/GLU/CAP

Standard A4 Glued Folder + 5mm Capacity

Supplied ‘made up’

Flat Size: 	H 406mm x W 457mm
Bleed Size:  	H 412mm x W 463mm
Trimmed/Finished Size:  	H 305.5mm x W 216.5mm

Need help?
01903 742003

www.alocalprinter.co.uk