Code: A5/GLU/CAP

Standard A5 Glued Folder + 5mm Capacity

Supplied ‘made up’

Flat Size: 	H 315mm x W 329mm
Bleed Size:  	H 321mm x W 335mm
Trimmed/Finished Size:  	H 215mm x W 153mm

Need help?
01903 742003

www.alocalprinter.co.uk