Roller Banner

Trimmed Size: 850mm x 2150mm
The Bleed/Artboard size is: 856mm x 2156mm
Visible area is 850mm x 2000mm

➠

Bleed Area	Your banner is trimmed on the top and side edges, with the bottom 				150mm going into the roller mechanism. Ensure backgrounds, images 			and colour extend into this area. This guarantees a great finish!
Trim Edge 	This is where we trim your design to the ordered size.
Safe Area 	It’s always best to keep any important text, logos in from the 						trim edge. Anything less than 20mm is not recommended

✁

✗

✓

Need help?
01903 742003

www.alocalprinter.co.uk

Roller mechanism 850mm (W) x 150mm (H)

This area is not visible