Code: A4/ST

Standard A4 Folder

Self-locking folder

Supplied Flat

Flat Size: 	H 411mm x W 521mm
Bleed Size:  	H 417mm x W 527mm
Trimmed/Finished Size:  	H 305mm x W 220mm

Need help?
01903 742003

www.alocalprinter.co.uk