Need help?
01903 742003

www.alocalprinter.co.uk

Code: A5/ST/CAP

Standard A5 Capacity Folder

4.3mm Capacity. Self-Locking

Supplied Flat

Flat Size: 	H 296mm  x  W 383mm
Bleed Size:  	H 302mm  x  W 389mm
Trimmed/Finished Size:  	H 220mm  x  W 160mm